0

2

4

6

8

10

12

14

16

0 2 4 6 8 10 12 14 16 18 20 22 24 0

5

10

15

20

25

30

35

40 B R

I

I-R/10

Time from beginning of pulse [s]

Curent,I[kA]&Field,B[T]Resistance,R[mΩ]&Resistivevoltage,I-R/10[V]

Current, Field, Resistance & Resistive Voltage in 1800-Turn Magnet Cooled to 30 K and Pulsed at 300 Volts to 7.2 kA, 14.5 T; 1-s Flat Top