2

4

6

8

10

12

14

16

1.0 1.5 2.0 2.5 3.0 3.5 4.0

300 K

80 K

30 K

Power [MVA]

Centralfield[T]

Field vs. Power for Magnets Pulsed from 300 K, 80 K & 30 K