20

30

40

50

60

70

80

90

100

0 5 10 15 20

0.4 0.3 0.2 0.1 .48 .46 .44 .42 .40

.06

.08 .10 .12 .14 .16 .18 .20 .22 .24 .26 .28 .30 .32 .34 .36 .38

Magnetic field [T]

Temperature[K]

Electrical Resistivity of Copper (ρ_0=.05 μΩ cm) vs. Temperature and Field