0

3

6

9

12

15

0 4 8 12 16 20 24

Stage 3

Stage 2

#1

Time from start of pulse [s]

Centralfield[T]

Field vs. Time for BNL Cryogenic Pulse Magnet at Stages 1, 2 and 3