5

6

7

8

9

10

11

65 70 75 80 85 90

MJ @ 1260 turns MJ @ 1200 turns

T @ 1260 turns 1200

Initial temperature, T_0 [K]

Field & Heating vs. Case #2 Magnet with 1200 or 1260 Turns