11.6

12.0

12.4

12.8

13.2

13.6

14.0

14.4

14.8

15.2

15.6

16.0

20 25 30 35 40 45 50

MJ

Teslas

Initial temperature [K]

Field & Heating vs. Temperature of Case #3 Magnet (1800 Turns)