10 12 14 16 18 20 22 24 26 28 30 32 34 36 38 40

-50 -40 -30 -20 -10 0 10 20 30 40 50

75 70 65

75 K 74 73 72 71 70 69 68 67 66 65 64 63 62

Axial distance from midplane [cm]

Radialdistancefromaxis[cm]

Final Temperature of Magnet Pulsed from 30 K to 14.5 T for 0.5 s