-

+

MUON EXPERIM ENT POWER SUPPLY FOR PULSING A 5 TESLA MAGNET 3600 A, +/ - 150 V .

MOD. 1 3600 A, + / -150 V

MAGNET CURRENT 3600 A

Rmax=0.038 Ohms

L=0.138 H hHenries