0

4

8

12

16

20

24

28

32

36

40

0 2 4 6 8 10

-500

-400

-300

-200

-100

0

100

200

300

400

500

Resistance Voltage

Current

Time from start of pulse [s]

Curent[kA]andResistance[mΩ]Power-suplyvoltage[V]

74 K Magnet Pulsed at 300 V to 7.2 kA, 10 T with 1-sec. Flat Top