\begin{thebibliography}{99}

\bibitem{CPR:indref1}M.J.~Burns, et al., \textsl{DARHT Accelerators Update and Plans for Initial Operation}, Proc. 1999 Acc. Conf., p.617.

\bibitem{CPR:Kilmer-private}P.C.~VanderArend, et al., \textsl{15-Foot Bubble Chamber Safety Report}, National Accelerator Laboratory Report NAL-48-A-2624, July 1972, Vol. 3.

\bibitem{CPR:SLAC158}R. W. Carr {\it et al.}, \textsl{E158 Liquid Hydrogen Target 
Milestone Report},
April 21, 1999, http://www.slac.stanford.edu/exp/e158/documents/target.ps.gz.

\bibitem{CPR:ASME}\textsl{ASME Boiler and Pressure Vessel Code}, ANSI/ASME BPV-VIII-1 (American
Society of Mechanical Engineers, New York, 1980), part UG-32.
\end{thebibliography}
