radii (cm) length (cm)

Be Window

Target containment

Shielding

Shielding

FeFe

Fe

Fe

0 250 500 -50

-25

0

25

Drain baffles

Outflow

HHH HHH HH Hg Pool

-27 -20 -14

HHH