radius (cm) length (m)

-9

0.0 2.5 5.0 7.5 0

25

50

75

-15

-35 +37

+66

+43 -43

-66

-43 +43

length (m)

B_z (T)

0.0 2.5 5.0 7.5 10.0 -10 -5 0 5 10

0.5 dp/p steps of 7.5 % from 185 to 215 (MeV/c)

length (m) β (cm)

0.0 2.5 5.0 7.5 10.0 0

50

100

150