LH2 Absorber

4 K He Tubes

16 K He Tubes

Coil Support

H2-He Heat Exchanger

LH2 Pump

Gas Cooled Leads

HTS Leads

30 K Shield

Longitudinal

Cold Mass Support

Radial Cold

Mass Support

0 400 800 millimeters