600 MM

WATER COOLING

SUPERCONDUCTING COIL

SPACE FOR COLD MASS SUPPORTS AND CRYO- GENICS

BEAM AXIS

800 MM

B = 1.25 T 0.03 T

RADIATION SHIELD

CRYOSTAT END