CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 2

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 3

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 4

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 5

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 6

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 7

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 8

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 9

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1010

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1111

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1212

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1313

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1414

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1515

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1616

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1717

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1818

CT-<CT> (mm)

-1000-800-600-400-200 0 200 400 600 8001000

E-<E> (MeV)

-150

-100

-50

0

50

100

150 1919