0 0.2 0.4 0.6 0.8 1 1.2

V’(MV/m)

0 5 0 1 0 0 1 5 0 T(nsec) z = 0 m = 56.7 = 170 (a)

0.1 0.15 0.2 0.25 0.3 0.35

E(GeV)

0 5 0 1 0 0 1 5 0 T(nsec) z = 0 m

56.7

1 1 3

1 7 0 (b)