RF Cavity

Gap

Superconducting Winding RF Cavity

b) Superconducting Solenoid Coils outside of the RF Cavity, CASE 3

Gap

Space for RF Cavity Services

300 mm a) Superconducting Solenoid Coils inside of the RF Cavity, CASE 1

Space for Cryostat and Cryogenic Services

Superconducting Winding