0 7 14 21 28 35 s ( m ) 0.0 4.5 9.0 13.5

18.0

22.5

27.0

31.5

36.0

40.5

45.0 β ( m )

-5 -4 -3 -2 -1 0 1 2 3 4

Dx ( m)

βx βy Dx