0 5 10 15 20 25 30 s ( m ) 0 11 22 33 44 55 66 77 88 99 110 β ( m )

1.4 1.6 1.8 2.0 2.2 2.4 2.6 2.8 3.0 3.2 3.4

Dx ( m)

βx βy Dx