0 40 80 120 160 200 s (m) 0 18 36 54 72. 90 108 126 144 162

(m)

-3.0

-2.5

-2.0

-1.5

-1.0

-0.5 0.0 0.5 1.0 1.5 2.0 2.5

Dx (m)