Capture Issues

ffl Yield and spectra of low-energy pions ffl Operation of a 20 T SC solenoid surround-

ing a ß 4 MW target

ffl Operation of rf cavity in high radiation en-

vironment

ffl High-gradient pulsed operation of low-frequency

rf cavities