The current Scenario

(100 GeV Higgs Factory)

¯’s/bunch:

In the Collider : 4 x 1012 Losses in Acceleration (1/2) : 8 x 1012 Losses in Cooling (1/2) : 16 x 1012 Capture efficiency (1/2) : 32 x 1012 Proton beam:

Pions/Protons (0.6) : 5.4 x 1013 ) 140 kJ

(16 GeV/c protons and 0.05 < pß < 0.80 GeV/c)

Bunches/Pulse (2) : 280 kJ 15 Hz Operation : 4 MW Power on the Target: Per Pulse : 28 kW 15 Hz Operation : 400 kW