Budgets Yearly Summary

Category FY99 FY00 FY01 FY02 FY03 Total Base Program $0.5M $1.5M $2M $2M $1M $7M AGS Operations $1M $1M $1M $1M $4M RF Power Source $0.05M $0.5M $1M $1M $1M $3.5M

FY99

Task ANL BNL LBL Princeton Industry Total Initial Jet Studies 20 85 105 AGS Beamline Upgrades 100 100 Pulsed Solenoid Design 50 50 RF Systems 65 75 50 190 Simulation Studies 75 5 80 Total 75 285 75 90 50 $525k

FY00 (Projected)

Task ANL BNL LBL Princeton Industry Total Initial Jet Studies 100 90 190 AGS Beamline Upgrades 400 400 AGS Operations 1000 1000 Magnet Systems 300 300 RF Systems 375 75 500 950 Simulation Studies 150 10 160 Total 150 2175 75 100 500 $3000k