May 1997: MUCOOL born at the Muon Collider Collaboration meeting, Orcas Island.

April 1998: MUCOOL Proposal submitted to Fermilab PAC.

April 1998: First DOE funds for MUCOOL hardware R&D -> $600K for FY98 used primarily to support RF R&D.

FY99: $1,200K DOE funds for MUCOOL activities (out of $2,000K for Muon Collider R&D). MUCOOL funds used for RF R&D plus cooling channel engineering design studies. In addition, $300K from FNAL Base Program funds allocated for Liquid Lithium Lens R&D.

MUCOOL History

August 1997: MUCOOL R&D program presented to Gilman panel.

May 1998: MUCOOL presentation to FNAL PAC.

June 1998: MUCOOL FY99 presentation to FNAL PAC (Aspen retreat).