4 0

We believe we need the full diagnostic capability of a single-particle experiment.

Beamline Location & Bunched Beam Option

To finish the muon beamline design studies we will need continued/further support from the beamline design experts at Fermilab. We would like sufficient support to have a beamline design report completed in the near future.

Assuming success ... we do not yet have a plan for the longer term R&D .... but the location of the single-particle experiment and the design of the associated beamline can open or close possible future options.

With this in mind, there has been an initial study exploring the possibility of creating a bunched muon beam at the Booster. The challenge is to produce "clean" muon bunches.