Upstream Measuring System

Auxiliary timing device TPC 1 -> helix before first bend Bent Solenoid TPC 2 -> helix after first bend rf accelerating cavity TPC 3 -> helix before second bend Bent Solenoid TPC 4 -> helix after second bend

First Momentum Measurment

Second Momentum Measurment rf

3 4 Time Measurement - Backup Solution