2 6

Multiple scattering too large in gas at atmospheric pressure -> low pressure tracker.

Prototype low pressure TPC constructed & tested at Princeton.

Low Pressure TPCs

Longitudinal diffusion measured over 10 cm drift with methane, ethane, isobutane, & CO2 -> slightly better than expected.

Drift velocity also measured, and agrees with expectations.

Princeton