1 6

(other experiments)shieldingMuonBeamlineCooling Apparatustarget anddumpshielding for primary beamPower Supplies(two floors)(other experiments)Li LensPowerLi LensPower

Example: The MCenter Beamline

Muon Cooling Beam Test Facility Layout

T. Kobolarchik