1 5 Beamline design status

Beamline studies need to be completed :

Momentum selection (100-300 MeV/c) ? Bunched beam possibilities -> more later

-> Beamline design report

Tom Kobilarchik, "Optimization of the D2 Beamlime",

MUCOOL Note 3.

D. Finley, T. Kobilarchik, N. Holtkamp, M.-J Yang,

"Beamline options for the muon cooling experiment" MUCOOL Note 31.

Initial beamline studies suggest that the MUCOOL needs can be provided using primary protons from either the MI or Booster, together with a "conventional" pion decay channel.