1 1

Year 99 00 01 02

Open Cell test cavity design/construction/test Design Prototype Module Construct Module Test Module Be Window R&D Cooling section design Cooling sect. constructn Cooling sect. bench test 15 cm Lithium Lens Second Lithium Lens

Contingent upon funding, etc.

Near-Term Strawman R&D Plan

By CY02 we will be ready to test a first cooling section in a low energy muon beam.