\begin{spacing}{0}

\chapter{Image Data for Chapter~\ref{chap:exp_result_velocity}}
\label{app:append_image}
\end{spacing}
%\baselineskip=12pt
\setlength{\baselineskip}{11.5pt}

\section{Images for Filament Velocity Measurement at Viewport 2}

\ \\

\tabletail{\hline \hline \multicolumn{8}{r}{\emph{Continued on next page}}\\}
\tablelasttail{\hline \hline}
\tablecaption{\label{tab:property_shot} Properties of shots used for filament velocity analysis.
Item 1 is shot number. Item 2 is camera frame rate~($\mu$s). Item 3 is beam energy~(GeV). Item 4
is number of bunches. Item 5 is number of protons~(Tp). Item 6 is magnetic field~(T).
Item 7 is designated velocity of jet shot~(m/s). Item 8 is lag time between peak laser emission and proton beam
arrival~($\mu$s). }
\tablefirsthead{\hline \hline \multicolumn{1}{|p{0.5in}|}{\textbf{1}} &
 \multicolumn{1}{p{0.5in}|}{2} &
 \multicolumn{1}{p{0.5in}|}{3} &
  \multicolumn{1}{p{0.5in}|}{4} &
   \multicolumn{1}{p{0.5in}|}{5} &
    \multicolumn{1}{p{0.5in}|}{6} &
     \multicolumn{1}{p{0.5in}|}{7} &
      \multicolumn{1}{p{0.5in}|}{8} \\ \hline}
\tablehead{\multicolumn{8}{c}
           {{ \tablename\ \thetable{}: \emph{Continued from previous page}}} \\
           \hline \hline \multicolumn{1}{|p{0.5in}|}{\textbf{1}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{2}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{3}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{4}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{5}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{6}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{7}} &
           \multicolumn{1}{p{0.5in}|}{\textbf{8}}  \\ \hline}
\begin{supertabular}{|p{0.5in}|p{0.5in}|p{0.5in}|p{0.5in}|p{0.5in}|p{0.5in}|p{0.5in}|p{0.5in}|}
11004 &   25  &  24  &  4 &  6  &  5  &  15  &  -4.03      \\
11007 &   25  &  24  &  4 &  6  &  5  &  15  &  -3.97      \\
11010 &   25  &  24  &  4 &  6  &  5  &  15  &  -3.99      \\
11019 &   25  &  24  &  16 &  10  &  10  &  15  &  -2.43      \\
11021 &   25  &  24  &  16 &  3.8  &  10  &  15  &  -2.43     \\
11032 &   25  &  24  &  16 &  20  &  10  &  15  &  -2.03      \\
12031 &   25  &  24  &  8 &  10  &  0  &  15  &  -1.93      \\
12032 &   25  &  24  &  8 &  10  &  15  &  15  &  -1.83      \\
12033 &   25  &  24  &  16 &  30  &  15  &  20  &  -1.85      \\
\end{supertabular}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot11004}
\caption{Shot number is 11004. Photo of sequence of 15 frames of captured image, where the timing for
the $1^{st}$ image is given in column 8 in Table~\ref{tab:property_shot}. } \label{fig:photo_16frame_shot11004}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot11004}
\caption{Location on the Hg jet surface for filament velocity measurement. Red circles indicate the location of filaments analysis. Shot number is 11004.  a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot11004}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot11007}
\caption{Shot number is 11007. } \label{fig:photo_16frame_shot11007}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot11007}
\caption{ Shot number is 11007. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot11007}
\end{figure}
\end{landscape}

\newpage
\clearpage


\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot11010}
\caption{Shot number is 11010. } \label{fig:photo_16frame_shot11010}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot11010}
\caption{Shot number is 11010. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot11010}
\end{figure}
\end{landscape}

\newpage
\clearpage


\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot11021}
\caption{Shot number is 11021. } \label{fig:photo_16frame_shot11021}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot11021}
\caption{Shot number is 11021. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot11021}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot11032}
\caption{Shot number is 11032. } \label{fig:photo_16frame_shot11032}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot11032}
\caption{Shot number is 11032. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot11032}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot12031}
\caption{Shot number is 12031. } \label{fig:photo_16frame_shot12031}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot12031}
\caption{Shot number is 12031. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot12031}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot12032}
\caption{Shot number is 12032. } \label{fig:photo_16frame_shot12032}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot12032}
\caption{Shot number is 12032. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot12032}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_16frame_shot12033}
\caption{Shot number is 12033. } \label{fig:photo_16frame_shot12033}
\end{figure}
\end{landscape}

\newpage
\clearpage

\begin{landscape}
\begin{figure}[!h]
\centering
\includegraphics[width=8in]{photo_point_shot12033}
\caption{Shot number is 12033. a.) Illustration of measured filaments. b.) Onset time of measured filament velocity.} \label{fig:photo_point_shot12033}
\end{figure}
\end{landscape}

\newpage
\clearpage

