0 5 10 15 20 25 30 35 0 1 2 3 4 5 6

5

3

6

30 11 5

5

Curve fit of data Numbers are used data points for average

Standard deviation (cm)

Average disruption length (cm)

5

Model Allometric1 Equation y = a*x^b Reduced Chi-Sqr

0.61672

Adj. R-Square 0.5914 Value Standard Error B a 1.93521 0.4794 b 0.30029 0.0959