0 20 40 60 80 100 0

5

10

15 N_p=2Tp,24GeV,

x

y=0.63mm^2 N_p=4Tp,24GeV,

x

y=0.72mm^2 N_p=10Tp,24GeV,

x

y=0.97mm^2 N_p=15Tp,24GeV,

x

y=1.19mm^2 N_p=30Tp,24GeV,

x

y=1.82mm^2 N_p=2Tp,14GeV,

x

y=1.22mm^2 N_p=10Tp,14GeV,

x

y=1.83mm^2 N_p=30Tp,14GeV,

y=3.30mm^2

Averaged energy deposition (10^{-13} J/g/proton)

Distance from nozzle (cm)