0 1 2 3 4 0.0 0.5 1.0 1.5 2.0 2.5 3.0 14GeV/c Horizontal plane 14GeV/c Vertical plane 24GeV/c Horizontal plane 24GeV/c Vertical plane

Beam size (1 mm)

Number of protons (10^{13})