0 2 4 6 8 10 12 14 16 0 1 2 3 4 5

Surface fluctuation of jet (mm RMS)

Magnetic field (T)

Distance from nozzle=30cm (top surface) Distance from nozzle=30cm (bottom surface) Distance from nozzle=60cm (top surface) Distance from nozzle=60cm (bottom surface)